From 0055932482314ec42fb7a090aa72ce1ad79e30b2 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 16 Sep 2012 16:50:34 -0700
Subject: Figure placement.

Apparently, this is a well know problem in LaTeX: when you have floats spanning
two columns to be placed at the top of the page, you need to place them on the
previous page. This is kind of retarded.
---
 algorithm.tex | 15 ++++++++-------
 1 file changed, 8 insertions(+), 7 deletions(-)

(limited to 'algorithm.tex')

diff --git a/algorithm.tex b/algorithm.tex
index 229f605..7f6543a 100644
--- a/algorithm.tex
+++ b/algorithm.tex
@@ -1,4 +1,5 @@
 \section{Algorithms}
+
 \label{sec:algorithms}
 
 In Section~\ref{sec:uniqueness}, we showed that a nearest-neighbor classifier
@@ -66,13 +67,13 @@ classifier. In general, the higher the threshold $\delta$, the lower the recall
 and the higher the precision.
 
 \begin{figure*}[t]
-  \centering
-  \includegraphics[width=0.99\textwidth]{graphics/limbs.pdf}
-  \caption{Histograms of differences between 9 skeleton measurements
-  $x_k$ (Section~\ref{sec:experiment}) and their expectation given the
-  class $y$. In red, the p.d.f. of a normal distribution with mean and
-  variance equal to the empirical mean and variance of the measurement}
-  \label{fig:error marginals}
+  \begin{center}
+    \includegraphics[width=0.99\textwidth]{graphics/hallway.png}
+  \end{center}
+  \vspace{-\baselineskip}
+  \caption{Experiment setting. Color image, depth image, and fitted
+  skeleton as captured by the Kinect in a single frame}
+  \label{fig:hallway}
 \end{figure*}
 
 \subsection{Sequential hypothesis testing}
-- 
cgit v1.2.3-70-g09d2

