From 3dc183008e040aef7c64a4a5ede9557856326e31 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 4 Mar 2012 16:36:06 -0800
Subject: Generate plots at the right size. The size shouldn't be set in the
 latex code

---
 algorithm.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'algorithm.tex')

diff --git a/algorithm.tex b/algorithm.tex
index fbe2dc8..38e0c39 100644
--- a/algorithm.tex
+++ b/algorithm.tex
@@ -27,7 +27,7 @@ In this work, we use the mixture of Gaussians model for skeleton recognition. Sk
 
 \begin{figure}[t]
   \centering
-  \includegraphics[height=4.4in, angle=90, bb=4.5in 1.5in 6.5in 7in]{graphics/ErrorMarginals}
+  \includegraphics{graphics/limbs.pdf}
   \caption{Histograms of differences between 9 skeleton measurements $x_k$ (Section~\ref{sec:experiment}) and their expectation given the class $y$.}
   \label{fig:error marginals}
 \end{figure}
-- 
cgit v1.2.3-70-g09d2

