From 01ebb22aeeb55d221d49c023df37534764a93b92 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Mon, 18 Mar 2013 18:26:10 +0100
Subject: Adapting to the new format

---
 experimental.tex | 16 +++++++++++-----
 1 file changed, 11 insertions(+), 5 deletions(-)

(limited to 'experimental.tex')

diff --git a/experimental.tex b/experimental.tex
index bda7040..76678ca 100644
--- a/experimental.tex
+++ b/experimental.tex
@@ -13,6 +13,7 @@ results.
   \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/frames.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{Distribution of the frequency of each individual in the
   dataset}
   \label{fig:frames}
@@ -106,15 +107,17 @@ pairs of joints:
 \begin{table}[!h]
 \begin{center}
 \vspace{-1.5\baselineskip}
-\begin{tabular}{lll}
-Head-ShoulderCenter & Elbow-Wrist & HipCenter-Hip\\
-ShoulderCenter-Shoulder & ShoulderCenter-Spine & Hip-Knee\\
-Shoulder-Elbow & Spine-HipCenter & Knee-Ankle\\
+\begin{tabular}{ll}
+Head-ShoulderCenter & Elbow-Wrist\\ 
+HipCenter-Hip & ShoulderCenter-Shoulder\\
+ShoulderCenter-Spine & Hip-Knee\\
+Shoulder-Elbow & Spine-HipCenter\\
+Knee-Ankle& \\
 \end{tabular}
 \vspace{-2.5\baselineskip}
 \end{center}
+\vspace{1\baselineskip}
 \end{table}
-\vspace{1.5\baselineskip}
 
 Each detected skeleton also has an ID number obtained from the figure detection
 stage. When there are consecutive frames with the same ID, it means that figure
@@ -240,6 +243,7 @@ recognition rates mostly above 90\% for group sizes of 3 and 5.
 \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/online-sht.pdf}
 \end{center}
+\vspace{-1.5\baselineskip}
     \caption{Results for the online setting, where $n_p$ is the size of
     the group as in Figure~\ref{fig:offline}}
     \label{fig:online}
@@ -249,6 +253,7 @@ recognition rates mostly above 90\% for group sizes of 3 and 5.
   \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/face.pdf}
   \end{center}
+\vspace{-1.5\baselineskip}
   \caption{Results for face recognition versus skeleton recognition
   with $n_p=5$ people}
   \label{fig:face}
@@ -308,6 +313,7 @@ they are walking towards the camera.
 \begin{figure}[t]
   \centering
   \includegraphics[width=0.49\textwidth]{graphics/back.pdf}
+\vspace{-1.5\baselineskip}
 \caption{Results with people walking away from and toward the camera}
 \label{fig:back}
 \end{figure}
-- 
cgit v1.2.3-70-g09d2

