From 3dc183008e040aef7c64a4a5ede9557856326e31 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 4 Mar 2012 16:36:06 -0800
Subject: Generate plots at the right size. The size shouldn't be set in the
 latex code

---
 experimental.tex | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'experimental.tex')

diff --git a/experimental.tex b/experimental.tex
index b96893a..8bd7b9d 100644
--- a/experimental.tex
+++ b/experimental.tex
@@ -100,7 +100,7 @@ the skeleton in a contiguous way. This allows us to define the concept of a
 
 \begin{figure}[t]
   \begin{center}
-    \includegraphics[width=0.60\textwidth]{graphics/frames.pdf}
+    \includegraphics[]{graphics/frames.pdf}
   \end{center}
   \vspace{-1.5\baselineskip}
   \caption{Distribution of the frame ratio of each individual in the
@@ -134,11 +134,11 @@ the algorithm.
 \begin{figure*}[t]
 \begin{center}
 \subfloat[Mixture of Gaussians]{
-    \includegraphics[width=0.49\textwidth]{graphics/offline-nb.pdf}
+    \includegraphics[]{graphics/offline-nb.pdf}
     \label{fig:offline:nb}
 }
 \subfloat[Sequential Hypothesis Learning]{
-    \includegraphics[width=0.49\textwidth]{graphics/offline-sht.pdf}
+    \includegraphics[]{graphics/offline-sht.pdf}
     \label{fig:offline:sht}
 }
   \caption{Precision-recall curve for the mixture of Gaussians model
-- 
cgit v1.2.3-70-g09d2

