From 9027a65ae09126a537a894e8236b73d621183752 Mon Sep 17 00:00:00 2001
From: Jon Whiteaker <jbw@berkeley.edu>
Date: Sun, 16 Sep 2012 17:16:29 -0700
Subject: removed names for anonymous submission and balanced refs

---
 experimental.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'experimental.tex')

diff --git a/experimental.tex b/experimental.tex
index 8133ec1..bda7040 100644
--- a/experimental.tex
+++ b/experimental.tex
@@ -328,7 +328,7 @@ show similar performance when there is no visible light.
 
 For the final experiment, we explore the potential of skeleton recognition with
 a higher resolution depth camera, as has been speculated for the Kinect
-2~\footnote{\url{http://www.eurogamer.net/articles/2011-11-25-kinect-2-so-accurate-it-can-lip-read}}.
+2~\footnote{\url{http://www.eurogamer.net/articles/2011-11-25-kinect-2-so-accurate-it}\\\url{-can-lip-read}}.
 Since a higher resolution camera is not readily available, we simulate a higher
 resolution by artificially reducing the noise from our Kinect dataset.
 %Predicting potential improvements of the prediction rate of our
-- 
cgit v1.2.3-70-g09d2

