From a0651121b5bf29743e19e69dd0421fedb0a8b2fd Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 4 Mar 2012 02:19:04 -0800
Subject: Some cosmetics changes.

Fix the frame distribution plot, one point was missing
also output plots directly in the right directory now
---
 experimental.tex | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'experimental.tex')

diff --git a/experimental.tex b/experimental.tex
index b30ba10..b96893a 100644
--- a/experimental.tex
+++ b/experimental.tex
@@ -35,6 +35,7 @@ capture the 3D coordinates of 20 body joints, and the color image.
   \begin{center}
     \includegraphics[width=0.99\textwidth]{graphics/hallway.png}
   \end{center}
+  \vspace{-\baselineskip}
   \caption{Experiment setting. Color image, depth image, and fitted
   skeleton as captured by the Kinect in a single frame}
   \label{fig:hallway}
@@ -99,8 +100,9 @@ the skeleton in a contiguous way. This allows us to define the concept of a
 
 \begin{figure}[t]
   \begin{center}
-    \includegraphics[width=0.49\textwidth]{graphics/frames.pdf}
+    \includegraphics[width=0.60\textwidth]{graphics/frames.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{Distribution of the frame ratio of each individual in the
   data set}
   \label{fig:frames}
@@ -215,6 +217,7 @@ algorithm and would thus bias the results in favor of skeleton recognition.
   \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/face.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{Precision-recall curve for face recognition and skeleton recognition}
   \label{fig:face}
 }
@@ -222,6 +225,7 @@ algorithm and would thus bias the results in favor of skeleton recognition.
   \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/back.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{Precision-recall curve 
   with people walking away
   from and toward the camera}
@@ -293,6 +297,7 @@ the newly obtained data set.
   \begin{center}
     \includegraphics[width=0.49\textwidth]{graphics/var.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{Precision-recall curve for the sequential hypothesis
   testing algorithm in the online setting for all the people with and
   without halving the variance of the noise}
-- 
cgit v1.2.3-70-g09d2

