From ff62de7b794b5cae8af37135579888c27785ff6b Mon Sep 17 00:00:00 2001
From: Jon Whiteaker <jbw@berkeley.edu>
Date: Thu, 1 Mar 2012 14:29:06 -0800
Subject: adding hallway pic

---
 experimental.tex | 12 ++++++++++++
 1 file changed, 12 insertions(+)

(limited to 'experimental.tex')

diff --git a/experimental.tex b/experimental.tex
index c0a559b..42d5965 100644
--- a/experimental.tex
+++ b/experimental.tex
@@ -23,12 +23,24 @@ in real-time without calibration.  Given that the Kinect for Windows SDK is the
 state-of-the-art, we use it to perform our data collection.
 
 \subsection{Environment}
+We collect data using the Kinect SDK over a period of a week in a research
+laboratory setting.  The Kinect is placed at the tee of a well traversed hallway. 
+The view of the Kinect is seen in \fref{fig:hallway}, showing the color image,
+the depth image, and the fitted skeleton of a single frame.
 
 \begin{itemize}
 \item 1 week
 \item 23 people
 \end{itemize}
 
+\begin{figure}
+  \begin{center}
+    \includegraphics[width=0.99\textwidth]{graphics/hallway.png}
+  \end{center}
+  \caption{}
+  \label{fig:hallway}
+\end{figure}
+
 \subsection{Data set}
 
 The original dataset consists of the sequence of all the frames where
-- 
cgit v1.2.3-70-g09d2

