From c32124428d70eb4a56336ba250d5ff4be93f1751 Mon Sep 17 00:00:00 2001
From: Jon Whiteaker <jbw@berkeley.edu>
Date: Wed, 20 Mar 2013 23:38:51 -0700
Subject: bib typo fix

---
 related.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'related.tex')

diff --git a/related.tex b/related.tex
index 561c041..ff5a763 100644
--- a/related.tex
+++ b/related.tex
@@ -61,7 +61,7 @@ capture~\cite{mocap-survey}.
 %imaging, and 
 The Kinect~\cite{kinect} is a widely available 3-D sensor (also known as a
 range camera) with a low price point, that has been leveraged to improve gait
-recognition~\cite{munsell:eccv12,hoffman:btas12}.  Figure detection and
+recognition~\cite{munsell:eccv12,hofmann:btas12}.  Figure detection and
 skeleton fitting have also been studied in motion capture, mapping to region of
 interest detectors and human body part identification or pose estimation
 respectively in this
-- 
cgit v1.2.3-70-g09d2

