From 0055932482314ec42fb7a090aa72ce1ad79e30b2 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 16 Sep 2012 16:50:34 -0700
Subject: Figure placement.

Apparently, this is a well know problem in LaTeX: when you have floats spanning
two columns to be placed at the top of the page, you need to place them on the
previous page. This is kind of retarded.
---
 uniqueness.tex | 10 ++++++++++
 1 file changed, 10 insertions(+)

(limited to 'uniqueness.tex')

diff --git a/uniqueness.tex b/uniqueness.tex
index 429e7de..3c23f7a 100644
--- a/uniqueness.tex
+++ b/uniqueness.tex
@@ -1,6 +1,16 @@
 \section{Skeleton uniqueness}
 \label{sec:uniqueness}
 
+\begin{figure*}[t]
+  \centering
+  \includegraphics[width=0.99\textwidth]{graphics/limbs.pdf}
+  \caption{Histograms of differences between 9 skeleton measurements
+  $x_k$ (Section~\ref{sec:experiment}) and their expectation given the
+  class $y$. In red, the p.d.f. of a normal distribution with mean and
+  variance equal to the empirical mean and variance of the measurement}
+  \label{fig:error marginals}
+\end{figure*}
+
 The most obvious concern raised by trying to use skeleton measurements as a
 recognizable biometric is their uniqueness. Are skeletons consistently and
 sufficiently distinct to use them for person recognition?
-- 
cgit v1.2.3-70-g09d2

