From 3dc183008e040aef7c64a4a5ede9557856326e31 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 4 Mar 2012 16:36:06 -0800
Subject: Generate plots at the right size. The size shouldn't be set in the
 latex code

---
 uniqueness.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'uniqueness.tex')

diff --git a/uniqueness.tex b/uniqueness.tex
index f034a21..84ec9ce 100644
--- a/uniqueness.tex
+++ b/uniqueness.tex
@@ -69,7 +69,7 @@ output of the algorithm for the threshold $\delta$ is defined as:
 
 \begin{figure}[t]
   \begin{center}
-    \includegraphics[width=0.6\columnwidth]{graphics/roc.pdf}
+    \includegraphics[]{graphics/roc.pdf}
   \end{center}
   \vspace{-1.5\baselineskip}
   \caption{ROC curve for several standard deviations of the noise and
-- 
cgit v1.2.3-70-g09d2

