From 73834f5ef1c7be73d054baf4cf5f14a39fef17dc Mon Sep 17 00:00:00 2001
From: Jon Whiteaker <jbw@berkeley.edu>
Date: Mon, 5 Mar 2012 11:12:04 -0800
Subject: jon's final pass part one

---
 uniqueness.tex | 14 +++++++-------
 1 file changed, 7 insertions(+), 7 deletions(-)

(limited to 'uniqueness.tex')

diff --git a/uniqueness.tex b/uniqueness.tex
index 66f21a4..ce1cd3d 100644
--- a/uniqueness.tex
+++ b/uniqueness.tex
@@ -34,14 +34,14 @@ additional image pairs from the input data. This is referred to as the
 In order to run an experiment similar to the one used in the face
 pair-matching problem (Section~\ref{sec:frb}), we use the Goldman
 Osteological Dataset \cite{deadbodies}. This dataset consists of
-skeletal measurements of 1538 skeletons uncovered around the world and
-dating throughout the last several thousand years. Given the way these
-data were collected, only a partial view of the skeleton is available,
-we keep six measurements: the lengths of four bones (radius, humerus,
-femur, and tibia) and the breadth and height of the pelvis.  Because
-of missing values, this reduces the size of the dataset to 1191.
+skeletal measurements of 1,538 skeletons uncovered around the world and dating
+from the modern geological era. Given the way this data was collected, only a
+partial view of the skeleton is available.  We keep six measurements: the
+lengths of four bones (radius, humerus, femur, and tibia) and the breadth and
+height of the pelvis.  Because of missing values, this reduces the size of the
+dataset to 1,191.
 
-From this dataset, 1191 matched pairs and 1191 unmatched pairs are
+From this dataset, 1,191 matched pairs and 1,191 unmatched pairs are
 generated.  In practice, the exact measurements of the bones of living
 subjects are not directly accessible. Therefore, measurements are
 likely to have an error rate, whose variance depends on the method of
-- 
cgit v1.2.3-70-g09d2

