From a0651121b5bf29743e19e69dd0421fedb0a8b2fd Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Sun, 4 Mar 2012 02:19:04 -0800
Subject: Some cosmetics changes.

Fix the frame distribution plot, one point was missing
also output plots directly in the right directory now
---
 uniqueness.tex | 1 +
 1 file changed, 1 insertion(+)

(limited to 'uniqueness.tex')

diff --git a/uniqueness.tex b/uniqueness.tex
index 927421a..76b7461 100644
--- a/uniqueness.tex
+++ b/uniqueness.tex
@@ -68,6 +68,7 @@ defined as:
   \begin{center}
     \includegraphics[width=10cm]{graphics/roc.pdf}
   \end{center}
+  \vspace{-1.5\baselineskip}
   \caption{ROC curve (true positive rate
   vs. false positive rate) for several standard deviations of the
   noise and for the state-of-the-art \emph{Associate-Predict} face
-- 
cgit v1.2.3-70-g09d2

