From 91305dab5fa7783e3267b606a6ba77e5a2351ff4 Mon Sep 17 00:00:00 2001
From: Thibaut Horel <thibaut.horel@gmail.com>
Date: Fri, 2 Nov 2012 01:13:42 +0100
Subject: Small mistake in previous commit

---
 general.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'general.tex')

diff --git a/general.tex b/general.tex
index 595023d..ea66aed 100644
--- a/general.tex
+++ b/general.tex
@@ -63,7 +63,7 @@ I will compute tomorrow, it should be roughly around 10).
 \end{theorem}
 
 Note that everything becomes nice when $R \geq I_d$. In this case, the smallest
-eigenvalue is larger than 1. Hence $\log\det R\geq 1$ and an approximation on
+eigenvalue is larger than 1. Hence $\log\det R\geq 0$ and an approximation on
 $\tilde{V}$ gives an approximation ration on $V$ (see discussion above).
 Furthermore, we can bound $\log(1+\mu)/\mu$ by 1 and I think we fall back on
 the approximation ratio of section 2.
-- 
cgit v1.2.3-70-g09d2

